\documentstyle{article}
\pagestyle{empty}
\setlength{\textwidth}{6.9in}
\setlength{\textheight}{8.75in}
\setlength{\topmargin}{-0.3in}
\setlength{\oddsidemargin}{-.3in}
\setlength{\parindent}{1pc}

\begin{document}
\bibliographystyle{plain}

% Macros for PostScript Figures:
\input psfig

\vspace*{1in}

\begin{center}

{\Huge\bf 
Automated Digital Image Analysis \\

\vspace{0.3in}

	of

\vspace{0.5in}

	Video Ice Crystal Data}

\vspace{0.5in}

{\huge
	Jane Niehues-Brooks \\ 
	and  \\
	Frederick C. Harris, Jr.

\vspace{0.2in}

	Department of Computer Science\\
	University of Nevada\\
	Reno, Nevada 89557 \\
	fredh@cs.unr.edu
}
\end{center}

\newpage

\vspace*{2in}

 \centerline{\psfig{figure=psfigs/noisyim0Spread.ps,height=4.0in}}
 

\end{document}
