Pt (0.2 μm thick)

Li- Ag (0.5 μm thick )

1.5 m m

6 m m

Nd YAG (1.06 μm)

Exam ple of Several Laser Shots

30°

Target Coupon

(Front View)

Magnified Cross Section

(Coupon from Above)