t = +40 ns t = +50 ns t = +75 ns t = +20 ns t = +30 ns x

a b cdef

2.1m m t = +10 ns

l (Å )

4000 7000

E xpa nsion

Plasm a

4000 7000 4000 7000 4000 7000 4000 70004000 7000

t = +100 ns

4000 7000

0