Spectroscopic Model

Best Fit - Synthetic and Experimental Spectra

• Improving atomic structure calculations for high Z neutrals: energy levels and

wavefunctions – cross sections and rates

• Reducing the number of calculated cross sections Ag II, Ag III, Ag IV. -

multi-representational model.

• Multi-element collisional radiative model - common free e− pool. • Local plasma effects on the radiator - detailed line shapes • Non-local effects on the spectra - radiation transport accurate RTE solution. • Plasma gradients – self-reversal feature.