\documentstyle[12pt,fleqn,epsf]{thesis}
\textwidth=6in
\textheight=8.75in
\evensidemargin=0.5in
\oddsidemargin=0.5in
\topmargin=-0.5in
\topskip=0pt
\baselineskip=13pt
\parskip=0pt
\parindent 8mm
\pagenumbering{roman}
\newcommand{\m}{\multicolumn}
\newcommand{\ovl}{\overline}
\newcommand{\hsp}{\hspace*}
\newcommand{\noi}{\noindent}
\newtheorem{thm}{Theorem}
\pagestyle{headings}

\begin{document}
\bibliographystyle{plain}
	
\input{chap00/text.tex}

{\baselineskip=13pt
\tableofcontents
\listoffigures
\listoftables
}
\newpage
\pagenumbering{arabic}

\input{chap01/text.tex}
\input{chap02/text.tex}
\input{chap03/text.tex}
\input{chap04/text.tex}
\input{chap05/text.tex}

\newpage
\baselineskip=13pt
%\input{ref}
\bibliography{bib}
\end{document}
